depth [m] along track (northeast) a:shipboard; b,c:lowered

a

Fall97 0 100 200 300 400

b

0 100 200 300 400

163 162 161 160 159 158 157 156 155 154 153 152 151 150 149 148 147 146 145 144 143 142 141 140 139 138 137 136 135 134 133 132 131 130 129 128depth [m]

c

Celtic Shelf Azores

-26 -24 -22 -20 -18 -16 -14 -12

0 500 1000

1500

2000

2500

3000

3500

4000

4500

5000

-26 -24 -22 -20 -18 -16 -14 -12 -10 0 10 tide [cm s -1] longitude

-50 -40 -30 -20 -10 0 10 20 30 40 50 cm s -1

11.33°W, 49.30°N to 27.05°W, 38.81°N: 1997/11/05 to 1997/11/11